PART 4 WATER SERVICES REGULATION AUTHORITY

21 Amendment to the Water Supply (Water Quality) Regulations 2001
In regulation 39 (contraventions by water undertakers) of the Water Supply (Water Quality) Regulations 2001, for “Director” there is substituted “ Authority ”.