SCHEDULE 1 Discrimination by public authorities: exceptions

PART 1 Bodies to which regulation 8 does not apply
Regulation 8(3)(a)
1 The House of Commons.
2 The House of Lords.
3 The authorities of either House of Parliament.
4 The Security Service.
5 The Secret Intelligence Service.
6 The Government Communications Headquarters.
7 A part of the armed forces of the Crown which is, in accordance with a requirement of the Secretary of State, assisting the Government Communications Headquarters.