3 Provisions relating to care standards coming into force on 1st October 2014
1st October 2014 is the day appointed for the coming into force of the following provisions of the Act—
(a) section 86 (restriction on applications for variation or removal of conditions);
(b) section 87 (rights of appeal);
(c) section 88 (unitary board);
(d) section 89 (Chief Inspectors);
(e) section 90 (independence of the Care Quality Commission); and
(f) section 95 (training for persons working in regulated activity).