SCHEDULE

Table 1 Stations at which the exemption from paragraph 1(1) will apply if the platform gap is not more than 85 millimetres measured horizontally and not more than 50 millimetres measured vertically
Station
Beckton
Beckton Park
Blackwall
Bow Church
Canning Town
Deptford Bridge
East India
Island Gardens
Mudchute
Royal Albert
West Silvertown

Table 2 Stations at which the exemption from paragraph 1(1) will apply if the platform gap is not more than 50 millimetres measured vertically and if, from the day indicated, the platform gap is not more than 85 millimetres measured horizontally
Stations	Days
Bank	1st January 2017
Cyprus	1st January 2017
Gallions Reach	1st January 2017
Shadwell	1st January 2017
West India Quay	1st January 2017
All Saints	1st January 2018
Canary Wharf	1st January 2018
Custom House for ExCel	1st January 2018
Devons Road	1st January 2018
Greenwich	1st January 2018
Limehouse	1st January 2018
Poplar	1st January 2018
Prince Regent	1st January 2018
Royal Victoria	1st January 2018

Table 3 Stations at which the exemption from paragraph 1(1) will apply if, from the day indicated, the platform gap is not more than 85 millimetres measured horizontally and not more than 50 millimetres measured vertically
Stations	Days
Westferry	1st January 2017
Crossharbour	1st January 2018
Articles 3 and 5