3 Amendment of the Electrical Equipment (Safety) Regulations 2016
1 The Electrical Equipment (Safety) Regulations 2016 are amended as follows.
2 For paragraph 2(n)(ii) of Schedule 5 (enforcement powers of the Health and Safety Executive for Northern Ireland under the 1978 Order), substitute—

“(ii) for paragraph (2), there were substituted—

“2 A person guilty of an offence under this Article is liable—
(a) on summary conviction, to a fine not exceeding the statutory maximum or imprisonment for a term not exceeding three months, or to both;
(b) on conviction on indictment, to a fine or imprisonment for a term not exceeding two years, or to both.””

.