2020 No. 1304
Exiting The European Union
Health And Safety
The Blood Safety and Quality (Amendment) (EU Exit) Regulations 2020
Made 18th November 2020
Coming into force in accordance with regulation 1

The Secretary of State makes these Regulations in exercise of the powers conferred by sections 8(1) and 8C of the European Union (Withdrawal) Act 2018.
2018 c. 16. The European Union (Withdrawal) Act 2018 was amended by the European Union (Withdrawal Agreement) Act 2020 (c. 1) (“the 2020 Act”); section 8C was inserted by section 21 of that Act.
A draft of this instrument has been approved by a resolution of each House of Parliament, in accordance with paragraphs 1 and 8F of Schedule 7 to the European Union (Withdrawal) Act 2018.
Paragraph 8F was inserted by paragraph 51 of Schedule 5 to the 2020 Act.